3.5 3.0 2.5 2.0 1.5 1.0

CO Column (x10^{18} ) [molec.cm^{-2}]

2000 2001 2002 2003 2004 2005 2006 2007 2008 2009 Year

1.0 0.5 0.0 -0.5

Anomalies (x10^{18} ) [molec.cm^{-2}]

1.0 0.5 0.0

(x10^{18} )